/*!40101 SET @OLD_CHARACTER_SET_CLIENT=@@CHARACTER_SET_CLIENT */;
/*!40101 SET NAMES utf8 */;
/*!50503 SET NAMES utf8mb4 */;
/*!40014 SET @OLD_FOREIGN_KEY_CHECKS=@@FOREIGN_KEY_CHECKS, FOREIGN_KEY_CHECKS=0 */;
/*!40101 SET @OLD_SQL_MODE=@@SQL_MODE, SQL_MODE='NO_AUTO_VALUE_ON_ZERO' */;
/*!40111 SET @OLD_SQL_NOTES=@@SQL_NOTES, SQL_NOTES=0 */;


-- 导出 bili_subtitle 的数据库结构
CREATE DATABASE IF NOT EXISTS `bili_subtitle` /*!40100 DEFAULT CHARACTER SET utf8mb4 */;
USE `bili_subtitle`;

-- 导出  表 bili_subtitle.subtitle 结构
CREATE TABLE IF NOT EXISTS `subtitle` (
  `ep_id` int(11) NOT NULL,
  `subtitle` text,
  PRIMARY KEY (`ep_id`)
) ENGINE=InnoDB DEFAULT CHARSET=utf8mb4;

-- 数据导出被取消选择。

/*!40101 SET SQL_MODE=IFNULL(@OLD_SQL_MODE, '') */;
/*!40014 SET FOREIGN_KEY_CHECKS=IFNULL(@OLD_FOREIGN_KEY_CHECKS, 1) */;
/*!40101 SET CHARACTER_SET_CLIENT=@OLD_CHARACTER_SET_CLIENT */;
/*!40111 SET SQL_NOTES=IFNULL(@OLD_SQL_NOTES, 1) */;
